Centrality (%)

0 20 40 60 80 pp

ηΔσ (rad) or φΔσ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 (rad) φΔσ

Centrality (%)

0 20 40 60 80 pp

ηΔσ (rad) or φΔσ

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 ALICE

= 2.76 TeV NNs Pb-Pb

= 2.76 TeV s pp ηΔσ

1-2 : 1-2 2-3 : 1-2 2-3 : 2-3 3-4 : 1-2 3-4 : 2-3 3-4 : 3-4

4-8 : 1-2 4-8 : 2-3 4-8 : 3-4 4-8 : 4-8

)c (GeV/

T,assoc p ) : c (GeV/

T,trig

p )c (GeV/_{T,assoc}p) :c (GeV/_{T,trig}p